\chapter{Scientific and Technical Quality}\label{chap:quality}
\begin{todo}{from the proposal template}
  Maximum length for the whole of Section 1 –-- twenty pages, not including the tables in
  Section 1.3
\end{todo}

\input{breakthrough}
\input{novelty}
\input{methodology}
%%% Local Variables: 
%%% mode: LaTeX
%%% TeX-master: "propB"
%%% End: 

